




         8.3   Memory                                       Page 8.3.1
         =============================================================

         This little utility lets you take a look at your computer's
         currently available memory. This can be helpful information
         to our Technical Support if ever there is a problem with your
         software.

         To look at memory:

         A. Press <M> at the "Utilities" menu and then press <Enter>.

            The "Memory" window will appear:

            ==========================================
            | Currently Available Memory = <n> bytes |
            ==========================================

            The number <n> will be the number of bytes of free memory
            available on your computer at this time.

         B. Press any key to return to the "Utilities" menu.


























         =============================================================
         MEMORY                                            Page  8.3.1
